-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

-0.4

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 no. steps = 29 u(0) = -0.36805602444149